/* List of types and symbols in libpthread examined by libthread_db.
   Copyright (C) 2003, 2006, 2007 Free Software Foundation, Inc.
   This file is part of the GNU C Library.

   The GNU C Library is free software; you can redistribute it and/or
   modify it under the terms of the GNU Lesser General Public
   License as published by the Free Software Foundation; either
   version 2.1 of the License, or (at your option) any later version.

   The GNU C Library is distributed in the hope that it will be useful,
   but WITHOUT ANY WARRANTY; without even the implied warranty of
   MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the GNU
   Lesser General Public License for more details.

   You should have received a copy of the GNU Lesser General Public
   License along with the GNU C Library; if not, see
   <http://www.gnu.org/licenses/>.  */

#ifndef DB_STRUCT_ARRAY_FIELD
# define DB_STRUCT_ARRAY_FIELD(type, field) DB_STRUCT_FIELD (type, field)
# define DB_ARRAY_VARIABLE(name) DB_VARIABLE (name)
# define STRUCTS_DEF_DEFAULTS 1
#endif

DB_STRUCT (pthread)
DB_STRUCT_FIELD (pthread, list)
DB_STRUCT_FIELD (pthread, report_events)
DB_STRUCT_FIELD (pthread, tid)
DB_STRUCT_FIELD (pthread, start_routine)
DB_STRUCT_FIELD (pthread, cancelhandling)
DB_STRUCT_FIELD (pthread, schedpolicy)
DB_STRUCT_FIELD (pthread, schedparam_sched_priority)
DB_STRUCT_FIELD (pthread, specific)
DB_STRUCT_FIELD (pthread, eventbuf)
DB_STRUCT_FIELD (pthread, eventbuf_eventmask)
DB_STRUCT_ARRAY_FIELD (pthread, eventbuf_eventmask_event_bits)
DB_STRUCT_FIELD (pthread, nextevent)

DB_STRUCT (list_t)
DB_STRUCT_FIELD (list_t, next)
DB_STRUCT_FIELD (list_t, prev)

DB_STRUCT (td_thr_events_t)
DB_STRUCT_ARRAY_FIELD (td_thr_events_t, event_bits)

DB_STRUCT (td_eventbuf_t)
DB_STRUCT_FIELD (td_eventbuf_t, eventnum)
DB_STRUCT_FIELD (td_eventbuf_t, eventdata)

DB_SYMBOL (stack_used)
DB_SYMBOL (__stack_user)
DB_SYMBOL (nptl_version)
DB_FUNCTION (__nptl_create_event)
DB_FUNCTION (__nptl_death_event)
DB_SYMBOL (__nptl_threads_events)
DB_VARIABLE (__nptl_nthreads)
DB_VARIABLE (__nptl_last_event)
DB_VARIABLE (__nptl_initial_report_events)

DB_ARRAY_VARIABLE (__pthread_keys)
DB_STRUCT (pthread_key_struct)
DB_STRUCT_FIELD (pthread_key_struct, seq)
DB_STRUCT_FIELD (pthread_key_struct, destr)

DB_STRUCT (pthread_key_data)
DB_STRUCT_FIELD (pthread_key_data, seq)
DB_STRUCT_FIELD (pthread_key_data, data)
DB_STRUCT (pthread_key_data_level2)
DB_STRUCT_ARRAY_FIELD (pthread_key_data_level2, data)

#if USE_TLS
DB_STRUCT_FIELD (link_map, l_tls_modid)
#endif

#if !defined IS_IN_libpthread || USE_TLS
DB_STRUCT_ARRAY_FIELD (dtv, dtv)
# define pointer_val pointer.val /* Field of anonymous struct in dtv_t.  */
DB_STRUCT_FIELD (dtv_t, pointer_val)
#endif
#if !defined IS_IN_libpthread || (defined TLS_TCB_AT_TP && TLS_TCB_AT_TP)
DB_STRUCT_FIELD (pthread, dtvp)
#endif

#ifdef STRUCTS_DEF_DEFAULTS
# undef DB_STRUCT_ARRAY_FIELD
# undef DB_ARRAY_VARIABLE
# undef STRUCTS_DEF_DEFAULTS
#endif
